;----------------------------------------------------------------------------
;	       Copyright (C) 1993, Microsoft Corporation
;
; You have a royalty-free right to use, modify, reproduce and distribute
; the Sample Custom Control Files (and/or any modified version) in any way
; you find useful, provided that you agree that Microsoft has no warranty,
; obligation or liability for any Custom Control File.
;----------------------------------------------------------------------------
; generic.def - module definition file for GENERIC.VBX custom control
;----------------------------------------------------------------------------

LIBRARY 	GENERIC
EXETYPE         WINDOWS
DESCRIPTION	'Visual Basic Generic Custom Control'

CODE		MOVEABLE
DATA		MOVEABLE SINGLE

HEAPSIZE	2048

EXPORTS
	WEP	@1	RESIDENTNAME
	GenStrlen

SEGMENTS
	WEP_TEXT FIXED

;----------------------------------------------------------------------------
